Xcms Public Review Draft

Index

Aallocation:

colormap, 8 read-only colormap cells, 7, 8

BadAccess, 9, 10

BadColor, 8, 9, 10

BadValue, 9, 10 black, 23 blue, 23

CCC, 6creation, 15

default, 6, 13, 14 freeing, 16 of colormap, 6, 13

Chroma, 28, 29 maximum, 28, 29

CIE metric lightness, 25, 26, 27, 28 maximum, 25, 26, 27 minimum, 26, 28

Client White Point, 6 of Color Conversion Context, 15

Color Characterization Data, 35

Color Conversion Context, 6 creation, 6, 13, 15 color conversion, 16 color name database, 4, 5, 8, 11 color:allocation, 8 conversion, 16 getting specification, 10 naming, 8 setting cells, 9 colormap, 8

CCC of, 13

D database:color name, 4, 5, 8, 11

device profile, 6, 35

Ffunction set, 34

LINEAR_RGB, 34

Ggamut compression, 6

client data, 15 procedure, 15 setting in Color Conversion Context, 15 gamut handling, 6 gamut querying, 23 green, 23

Psychometric Chroma, 25, 26, 27

maximum, 25, 26, 27

Psychometric Hue Angle, 25, 26, 27, 28

Rread-only colormap cells, 8

allocating, 7, 8 red, 23

Screen, 1, 6, 13, 14, 35

Status, 6

Value, 28, 29, 30

maximum, 28, 29 minimum, 30

Wwhite point adjustment, 6

white point, 6 37

Xcms Public Review Draft white, 23

X Device Color Characterization Convention, 34

X RGB, 3, 8, 9, 10

XAllocColor, 8, 22

XAllocNamedColor, 5, 8, 13, 34

XcmsAddColorSpace, 6, 31, 32

XcmsAddFunctionSet, 6, 34

XcmsAllocColor, 7, 8, 13

XcmsAllocNamedColor, 5, 7, 8, 9, 13

XcmsCCC, 14

XcmsCCCofColormap, 13

XcmsCIELabClipab, 20

XcmsCIELabClipL, 20

XcmsCIELabClipLab, 20

XcmsCIELabQueryMaxC, 20, 25

XcmsCIELabQueryMaxL, 25, 26

XcmsCIELabQueryMaxLC, 26

XcmsCIELabQueryMinL, 26

XcmsCIELabToCIEXYZ, 33

XcmsCIELabWhiteShiftColors, 21

XcmsCIELuvClipL, 20

XcmsCIELuvClipLuv, 20

XcmsCIELuvClipuv, 20

XcmsCIELuvQueryMaxC, 20, 26, 27

XcmsCIELuvQueryMaxL, 27

XcmsCIELuvQueryMaxLC, 27, 28

XcmsCIELuvQueryMinL, 28

XcmsCIELuvToCIEuvY, 33

XcmsCIELuvWhiteShiftColors, 21, 22

XcmsCIEuvY, 22

XcmsCIEuvYToCIELuv, 33

XcmsCIEuvYToCIEXYZ, 33

XcmsCIEuvYToTekHVC, 34

XcmsCIExyYToCIEXYZ, 34

XcmsCIEXYZ, 19, 20

XcmsCIEXYZToCIELab, 33

XcmsCIEXYZToCIEuvY, 33

XcmsCIEXYZToCIExyY, 33

XcmsCIEXYZToRGBi, 33

XcmsColor, 1, 8, 9, 10, 11, 17, 19, 33

XcmsColorFormat, 2

XcmsColorSpace, 32, 33, 34

XcmsConversionProc, 33

XcmsConvertColors, 16, 17

XcmsCreateCCC, 6, 15, 16

XcmsDefaultCCC, 6, 14

XcmsFailure, 6, 17

XcmsFormatOfPrefix, 2, 31, 32, 34

XcmsFreeCCC, 6, 14, 15, 16

XcmsFunctionSet, 34, 35 XcmsInitFailure, 35

XcmsInitNone, 35

XcmsInitSuccess, 35

XcmsLookupColor, 5, 7, 8, 11, 13

XcmsParseStringProc, 33

XcmsPerScrnInfo, 35

XcmsPrefixOfFormat, 2, 31, 32, 34

XcmsQueryBlack, 23

XcmsQueryBlue, 23, 24

XcmsQueryColor, 7, 9, 10, 13

XcmsQueryColors, 7, 10

XcmsQueryGreen, 24

XcmsQueryRed, 24

XcmsQueryWhite, 24, 25

XcmsRGB, 3, 22

XcmsRGBFormat, 8, 17

XcmsRGBi, 3, 19, 20

XcmsRGBiFormat, 17

XcmsRGBiToCIEXYZ, 34

XcmsRGBiToRGB, 34

XcmsRGBToRGBi, 34

XcmsScreenInitProc, 35

XcmsSetCCCOfColormap, 6, 13, 14

XcmsSetCompressionProc, 6, 15

XcmsSetWhiteAdjustProc, 6, 15

XcmsSetWhitePoint, 6, 15

XcmsStoreColor, 7, 9, 13

XcmsStoreColors, 7, 9, 10, 13

XcmsSuccess, 6

XcmsSuccessWithCompression, 6, 9, 17, 19, 21

XcmsTekHVCClipC, 21

XcmsTekHVCClipV, 20

XcmsTekHVCClipVC, 21

XcmsTekHVCQueryMaxC, 28

XcmsTekHVCQueryMaxV, 28, 29

XcmsTekHVCQueryMaxVC, 29

XcmsTekHVCQueryMaxVSamples, 29, 30

XcmsTekHVCQueryMinV, 30

XcmsTekHVCToCIEuvY, 34

XcmsTekHVCWhiteShiftColors, 22

XcmsUndefinedFormat, 8, 11

XColor, 1, 9

XDCCC, 34

XLookupColor, 5, 13, 34

XParseColor, 5, 13, 34

XQueryColor, 10

XQueryColors, 10

XStoreColor, 9

XStoreColors, 9

XStoreNamedColor, 5, 13, 34 38